Reports to Conferences

1) Congresso SIF (Società Italiana di Fisica), Trento (I), oct. 1989

M.Boldini et al., A system of proportional wire chambers for the readout of the HPC calorimeter, unpublished 2) Congresso SIF (Società Italiana di Fisica), L’Aquila (I), oct. 1991 A.Perrotta (Collaborazione DELPHI), Studio di fotoni prodotti nello stato finale nei decadimenti adronici della Z^0 e limiti su nuovi fenomeni, unpublished 3) Meeting on photon radiation from quarks, Genève (CH), Sept. 1992 A.Perrotta, Event definitions in radiative hadronic Z^0 decays, unpublished 4) Congresso SIF (Società Italiana di Fisica), Udine (I), oct. 1993

A.Perrotta (Collaborazione DELPHI), Studio dei fotoni di radiazione da stato finale nei decadimenti adronici della Z^0 , unpublished 5) BALEP, incontro sulla fisica italiana al LEP, Bari (I), apr. 1994

A.Perrotta, Radiazione di fotoni dallo stato finale qq̄ al LEP e confronto con modelli di QCD, unpublished 6) 27^{th} International Conference on High Energy Physics, Glasgow (GB), jul. 1994 DELPHI collaboration, Study of prompt photon production in hadronic Z^0 decay , DELPHI 94-82 PHYS 399 7) 27^{th} Nuclear Science Symposium and Medical Imaging Conference, Norfolk, VA, USA, oct. 1994.

A.De Min et al., Performance of the HPC calorimeter in DELPHI, published in the proceedings 8) 28^{th} Nuclear Science Symposium and Medical Imaging Conference, San Francisco (USA), oct. 1995 V.Obraztsov et al., Performance of the DELPHI Small Angle Tile Calorimeter, IEEE Trans. Nucl. Sci. 43 (3)(1996) 1496 9) Padova LEP, incontro sulla fisica italiana al LEP, Padova (I), apr. 1996 A.Perrotta, Misure sperimentali di R_b e R_c al LEP, unpublished 10) 6^{th} Topical Seminar on Experimental Apparatus for Particle Physics and Astrophysics, San Miniato (I), apr. 1996 B.Tomé et al., Performance of the new high precision luminosity monitor of DEL- PHI, Nucl. Phys. B Proc. Suppl. 54B, (1997) 273 11) 6^{th} International Conference on Calorimetry in High-Energy Physics, Laboratori Nazionali di Frascati, INFN (I) jun. 1996 Y.Gouz et al., The performance of the DELPHI STIC detector at LEP, published in the proceedings 12) Lake Louise Winter Institute, Lake Louise (Can), feb. 1997

A.Perrotta, Searches at LEP2 with the DELPHI detector, (to be) published in the proceedings 13) PILEP, incontro sulla fisica italiana al LEP, Pisa (I), apr. 1997

A.Perrotta, Ricerca di chargini degeneri in massa con l’LSP a LEP2, unpublished 14) 5^{th} Topical Seminar on the Irresistible Rise of the Standard Model, San Miniato (I), apr. 1997 S.Paiano, A.Perrotta, Search for SUSY particles mass degenerate with the LSP with the DELPHI detector at LEP, (to be) published in the proceedings 15) International Europhysics Conference on High-Energy Physics, Jerusalem (Isr) aug.

1997