S1 POT 1

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 2000

4000

6000

8000

10000

12000

14000

-10 -5 0 5 10

ΔStrip-u

0 2000

4000

6000

8000

10000

12000

14000

-10 -5 0 5 10

ΔStrip-v

S2 POT 2

0 10000

20000

30000

40000

50000

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 10000

20000

30000

40000

50000

60000

-10 -5 0 5 10

ΔStrip-u

0 10000

20000

30000

40000

50000

-10 -5 0 5 10

ΔStrip-v

S3 POT 3

0 5000

10000

15000

20000

25000

30000

35000

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 5000

10000

15000

20000

25000

-10 -5 0 5 10

ΔStrip-u

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

-10 -5 0 5 10

ΔStrip-v

S4 POT 4

0 1000

2000

3000

4000

5000

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 2500

5000

7500

10000

12500

15000

17500

20000

-10 -5 0 5 10

ΔStrip-u

0 500 1000

1500

2000

2500

-10 -5 0 5 10

ΔStrip-v

S4 POT 5

0 5000

10000

15000

20000

25000

30000

35000

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 5000

10000

15000

20000

25000

30000

35000

40000

-10 -5 0 5 10

ΔStrip-u

0 5000

10000

15000

20000

25000

30000

35000

40000

-10 -5 0 5 10

ΔStrip-v

S5 POT 6

0 200 400 600 800 1000

1200

1400

1600

1800 x 10^2

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 200 400 600 800 1000

1200

1400

1600 x 10^2

-10 -5 0 5 10

ΔStrip-u

0 2000

4000

6000

8000

10000 x 10

-10 -5 0 5 10

ΔStrip-v

S5 POT 7

0 2000

4000

6000

8000

10000

12000

14000

16000

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 2500

5000

7500

10000

12500

15000

17500

20000

-10 -5 0 5 10

ΔStrip-u

0 2500

5000

7500

10000

12500

15000

17500

20000

-10 -5 0 5 10

ΔStrip-v

S6 POT 8

0 200 400 600 800 1000

1200

1400

1600

1800 x 10^2

-10 -5 0 5 10

2003/11/27 12.13

ΔStrip-x

Data MC

0 200 400 600 800 1000

1200

1400 x 10^2

-10 -5 0 5 10

ΔStrip-u

0 250 500 750 1000

1250

1500

1750

2000 x 10^2

-10 -5 0 5 10

ΔStrip-v