DIS sample

0 2000

4000

6000

-4 -2 0 2 4

2004/03/24 17.48

Residual (mm)

Initial Step 0

0 10000

20000

30000

-1 -0.5 0 0.5 1

Residual (mm)

0 10000

20000

30000

-1 -0.5 0 0.5 1

Residual (mm) -1 -0.5 0 0.5 1

-1 -0.5 0 0.5 1

Residual (mm)

0 5000

10000

15000

-1 -0.5 0 0.5 1

Residual (mm) 0 5000

10000

15000

20000

-1 -0.5 0 0.5 1

Residual (mm)

DIS sample

0 1000

2000

3000

4000

5000

6000

-5 -4 -3 -2 -1 0 1 2 3 4 5

Entries Mean RMS 65920 1.095 0.6475

2004/03/24 17.48

Residual (mm)

0 1000

2000

3000

4000

5000

6000

-5 -4 -3 -2 -1 0 1 2 3 4 5

Entries Mean RMS 65920 0.1458E-01 0.6069

Residual (mm)

DIS sample

0 5000

10000

15000

20000

25000

30000

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 0.1613 0.1027

2004/03/24 17.48

Residual (mm)

0 5000

10000

15000

20000

25000

30000

35000

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 0.4769E-02 0.9566E-01

Residual (mm)

DIS sample

0 5000

10000

15000

20000

25000

30000

35000

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 -0.1069 0.7233E-01

2004/03/24 17.48

Residual (mm)

0 5000

10000

15000

20000

25000

30000

35000

40000

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 -0.6174E-03 0.6670E-01

Residual (mm)

DIS sample

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 0 0.000 0.000

2004/03/24 17.48

Residual (mm)

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 0 0.000 0.000

Residual (mm)

DIS sample

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 -0.3105 0.1788

2004/03/24 17.48

Residual (mm)

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 -0.3372E-02 0.1781

Residual (mm)

DIS sample

0 2500

5000

7500

10000

12500

15000

17500

20000

22500

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 0.2771 0.1633

2004/03/24 17.48

Residual (mm)

0 2500

5000

7500

10000

12500

15000

17500

20000

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 65920 0.3365E-02 0.1591

Residual (mm)