Rho sample

0 5 10 15 20

-4 -2 0 2 4

2004/03/24 17.10

Residual (mm)

Initial Step 0

0 20 40 60 80 100

-1 -0.5 0 0.5 1

Residual (mm)

0 25 50 75 100

-1 -0.5 0 0.5 1

Residual (mm) -1 -0.5 0 0.5 1

-1 -0.5 0 0.5 1

Residual (mm)

0 20 40

-1 -0.5 0 0.5 1

Residual (mm) 0 20 40 60

-1 -0.5 0 0.5 1

Residual (mm)

Rho sample

0 2.5 5 7.5 10 12.5 15 17.5 20

-5 -4 -3 -2 -1 0 1 2 3 4 5

Entries Mean RMS 252 1.408 0.6981

2004/03/24 17.10

Residual (mm)

0 2.5 5 7.5 10 12.5 15 17.5 20

-5 -4 -3 -2 -1 0 1 2 3 4 5

Entries Mean RMS 252 0.6349E-02 0.5539

Residual (mm)

Rho sample

0 20 40 60 80 100

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 0.2095 0.1070

2004/03/24 17.10

Residual (mm)

0 20 40 60 80 100

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 -0.3968E-03 0.9150E-01

Residual (mm)

Rho sample

0 20 40 60 80 100

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 -0.1381 0.8127E-01

2004/03/24 17.10

Residual (mm)

0 20 40 60 80 100 120

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 0.1190E-02 0.6074E-01

Residual (mm)

Rho sample

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 0 0.000 0.000

2004/03/24 17.10

Residual (mm)

-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 0 0.000 0.000

Residual (mm)

Rho sample

0 10 20 30 40 50

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 -0.4048 0.2046

2004/03/24 17.10

Residual (mm)

0 10 20 30 40 50 60

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 -0.3571E-02 0.1717

Residual (mm)

Rho sample

0 10 20 30 40 50 60

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 0.3536 0.1794

2004/03/24 17.10

Residual (mm)

0 10 20 30 40 50 60 70

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Entries Mean RMS 252 0.2778E-02 0.1497

Residual (mm)