xl

LPS Stations 456 - (acc2wlb) no TLT request in MC

0 1000

2000

3000

0.2 0.4 0.6 0.8 1

2006/11/02 13.20

0.8 0.9 1 1.1 1.2

0.2 0.4 0.6 0.8 1

pt2 0 2500

5000

7500

10000

0 0.1 0.2 0.3 0.4 0.5 0.8 0.9 1 1.1 1.2

0 0.2 0.4

stat 0 20000

40000

0 2 4 6 8 0.8 0.9 1 1.1 1.2

0 2 4 6 8

dpot 0 2000

4000

6000

8000

0 1 2 3 0.8 0.9 1 1.1 1.2

0 1 2 3

dpip

LPS Stations 456 - (acc2wlb) no TLT request in MC

0 2000

4000

0 1 2 3

2006/11/02 13.20

0.8 0.9 1 1.1 1.2

0 1 2 3

e-pz 0 5000

10000

15000

30 40 50 60 70 0.8 0.9 1 1.1 1.2

30 40 50 60 70

Q2 0 5000

10000

15000

20000

0 20 40 60 80 100 0.8 0.9 1 1.1 1.2

0 25 50 75 100

W 0 2000

4000

6000

0 50 100 150 200 250 0.8 0.9 1 1.1 1.2

0 100 200

zvtx

LPS Stations 456 - (acc2wlb) no TLT request in MC

0 2500

5000

7500

10000

-40 -20 0 20 40

2006/11/02 13.21

0.8 0.9 1 1.1 1.2

-50 -25 0 25 50

enel 0 2000

4000

6000

8000

10 15 20 25 30 35 0.8 0.9 1 1.1 1.2

10 20 30

thel 0 10000

20000

30000

2.6 2.8 3 3.2 0.8 0.9 1 1.1 1.2

2.6 2.8 3 3.2

log10(xda) 0 2500

5000

7500

10000

-4 -3 -2 -1 0.8 0.9 1 1.1 1.2

-4 -3 -2 -1

yda

LPS Stations 456 - (acc2wlb) no TLT request in MC

0 5000

10000

15000

0 0.2 0.4 0.6

2006/11/02 13.21

0.8 0.9 1 1.1 1.2

0 0.2 0.4 0.6

pt2 0 10000

20000

30000

40000

0 0.1 0.2 0.3 0.4 0.5 0.8 0.9 1 1.1 1.2

0 0.2 0.4

xl 0 2000

4000

6000

8000

0.2 0.4 0.6 0.8 1 0.8 0.9 1 1.1 1.2

0.2 0.4 0.6 0.8 1

pt2 0 10000

20000

30000

40000

0 0.1 0.2 0.3 0.4 0.5 0.8 0.9 1 1.1 1.2

0 0.2 0.4